Values for the Wilcoxon signed-rank Test

Reject the hypothesis of identical populations if the test statistic is less than the value T shown in the following table.

Sample size Level of significance for a two-tailed test

n 10% 5% 2% 1% 5 1 – – – 6 3 1 – – 7 4 3 1 – 8 6 4 2 1 9 9 6 4 2 10 11 9 6 4 11 14 11 8 6 12 18 14 10 8 13 22 18 13 10 14 26 22 16 13 15 31 26 20 16 16 36 30 24 20 17 42 35 28 24 18 48 41 33 28 19 54 47 38 33 20 61 53 44 38 21 68 59 50 43 22 76 66 56 49 23 84 74 63 55 24 92 82 70 62 25 101 90 77 69